Copyright: ©2003. Sony Pictures Digital Inc.
Citation: ©2003. Sony Pictures Digital Inc.


About this File

This file contains context-sensitive help topics.

Revised August 1, 2003


 Frequency

Drag the slider to set the frequency at which the filter oscillates (rings).

The behavior of the Frequency slider is dependent on the selected Filter type radio button:

•	When Low Pass is selected, frequencies below this frequency will be played.

•	When Band Pass is selected, the frequency band will be played.

•	When High Pass is selected, frequencies above this frequency will be played.


Resonance

Drag the slider to set the level of the effect.

The Resonance setting determines several parameters for the plug-in:

•	The amount of gain that is applied to the resonant frequency.

•	The width of the frequency range that will be boosted.

•	The duration of the ringing effect.

•	How quickly the filter cuts off.


Type

Click a radio button to select the type of filter you want to apply:

Low Pass	Frequencies below the Frequency setting will be played.
Band Pass	Frequencies around the Frequency setting will be played.
High Pass	Frequencies above the Frequency setting will be played.


Order

Click a radio button to set the rolloff of the filter:

Second	Applies a second-order (12 dB per octave) filter
Fourth	Applies two second-order filters in series (24 dB per octave). This setting will produce higher peaks and a more pronounced effect.


Bypass

Select the check box to bypass the Resonant Filter effect. Clear the check box to hear the effect.


Dry Out
Wet/Dry

Drag the slider to set the balance of the processed and unprocessed signals mixed into the output.