Copyright: ©2003. Sony Pictures Digital Inc.
Citation: ©2003. Sony Pictures Digital Inc.


Welcome
About this file

This file contains context-sensitive help topics and is not intended for browsing.

Revised August 1, 2003


ASIO Device

The name of the currently selected ASIO driver.

Use the Audio tab in the Preferences dialog to select a different driver.


Buffering

The amount of buffering that will be performed by the selected driver.

Click the Configure button to adjust settings for the device.


ASIO Clock Source

The source and sample rate of the device’s timecode.

Click the Configure button to adjust settings for the device.


Enable ASIO 2.0 Direct Monitoring

If your hardware supports it, you can select this check box if you want to use direct monitoring, a zero-latency protocol supported by ASIO 2.0.


Configure

Click to adjust settings for the currently selected ASIO device.


About

Click to display information about the plug-in.


Clock State

Displays the current state of the device sending MIDI clock to your ASIO device.


ASIO 2.0 Direct Monitoring

Choose a setting from the drop-down list to use direct monitoring, a zero-latency protocol supported by ASIO 2.0.


ASIO Clock Source

Choose a device from the drop-down list to choose the decice that will send MIDI clock to your ASIO device.


ASIO Buffer Setting

Choose a setting from the drop-down list to set the amount of buffering that will be performed by the selected driver.


Refresh

Click to update the contents of the window.