Copyright: ©2004. Sony Pictures Digital Inc.
Citation: ©2004. Sony Pictures Digital Inc.


About This File

This Help file contains context-sensitive help topics.

Revised October 7, 2004


Number of Extra Ports
Number of extra stereo ports

Specifies the number of extra stereo ports the ACID Pro 5.0 ReWire synth will expose to ReWire mixer applications.

After changing this setting, you’ll need to close and restart ACID software and any active ReWire mixer application. Port changes cannot be changed dynamically when using ReWire.


Mono
Number of extra mono ports

Specifies the number of extra mono ports the ACID Pro 5.0 ReWire synth will expose to ReWire mixer applications.

After changing this setting, you’ll need to close and restart ACID software and any active ReWire mixer application. Port changes cannot be changed dynamically when using ReWire.

Some ReWire mixers work better with mono inputs than stereo inputs. Check your ReWire mixer application’s documentation for more specific requirements.


IDH IMPORTANT


Priority

Choose a setting from the drop-down list to set the priority that is assigned to your audio buffers.

Increasing the buffers' priority can help you attain smoother playback, but it can also adversely affect other processes.