;************************************************************************
;
; Copyright (c) Microsoft Corporation. All rights reserved.
; This is the .DEF file for the Microsoft Visual C++ Run-Time Library DLL
; The release version is SAMPLE_M.dll and the debug version SAMPLD_M.dll.
;
;************************************************************************
LIBRARY SAMPLE_M
EXPORTS
