;
; Definition file of XINPUT1_4.dll
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "XINPUT1_4.dll"
EXPORTS
;DllMain@12
XInputGetState@8
XInputSetState@8
XInputGetCapabilities@12
XInputEnable@4
XInputGetBatteryInformation@12
XInputGetKeystroke@12
XInputGetAudioDeviceIds@20
;ord_100@8 @100
;ord_101@12 @101
;ord_102@4 @102
;ord_103@4 @103
;ord_104@8 @104
;ord_108@16 @108
