LIBRARY api-ms-win-devices-config-l1-1-1

EXPORTS

CM_Get_Device_ID_List_SizeW@12
CM_Get_Device_ID_ListW@16
CM_Get_Device_IDW@16
CM_Get_Device_Interface_List_SizeW@16
CM_Get_Device_Interface_ListW@20
CM_Get_Device_Interface_PropertyW@24
CM_Get_DevNode_PropertyW@24
CM_Get_DevNode_Status@16
CM_Get_Parent@12
CM_Locate_DevNodeW@12
CM_MapCrToWin32Err@8
CM_Register_Notification@16
CM_Unregister_Notification@4
