LIBRARY api-ms-win-core-threadpool-l1-2-0

EXPORTS

CallbackMayRunLong@4
CancelThreadpoolIo@4
CloseThreadpool@4
CloseThreadpoolCleanupGroup@4
CloseThreadpoolCleanupGroupMembers@12
CloseThreadpoolIo@4
CloseThreadpoolTimer@4
CloseThreadpoolWait@4
CloseThreadpoolWork@4
CreateThreadpool@4
CreateThreadpoolCleanupGroup@0
CreateThreadpoolIo@16
CreateThreadpoolTimer@12
CreateThreadpoolWait@12
CreateThreadpoolWork@12
DisassociateCurrentThreadFromCallback@4
FreeLibraryWhenCallbackReturns@8
IsThreadpoolTimerSet@4
LeaveCriticalSectionWhenCallbackReturns@8
QueryThreadpoolStackInformation@8
ReleaseMutexWhenCallbackReturns@8
ReleaseSemaphoreWhenCallbackReturns@12
SetEventWhenCallbackReturns@8
SetThreadpoolStackInformation@8
SetThreadpoolThreadMaximum@8
SetThreadpoolThreadMinimum@8
SetThreadpoolTimer@16
SetThreadpoolTimerEx@16
SetThreadpoolWait@12
SetThreadpoolWaitEx@16
StartThreadpoolIo@4
SubmitThreadpoolWork@4
TrySubmitThreadpoolCallback@12
WaitForThreadpoolIoCallbacks@8
WaitForThreadpoolTimerCallbacks@8
WaitForThreadpoolWaitCallbacks@8
WaitForThreadpoolWorkCallbacks@8
